Title: Chart Audits – a Primer for Practice Supervisors

Input your answer, then flip the card

Q: In what situation are comments required in a chart audit report?
A: if the standard of care is not met

Q: What is the main purpose of the medical record?
A: continuity of care or information sharing between care providers